)_{c.m.}^{-Ω}θ cos(

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

(GeV) γE

7 7.5 8 8.5 9 9.5 10

Counts

70 80 90 100 110 120 130 140 150