0 50 100 150 200 250 300 350 400 450 500 100 200 300 400 500 600 700 800 ADC of PMT 01^{adc01}_{Entries 22340}

Mean 211.4 RMS 117.2

ADC of PMT 01

0 50 100 150 200 250 300 350 400 450 500 0

200 400

600 800

1000

1200

ADC of PMT 02^{adc02}_{Entries 40105}

Mean 164.6 RMS 104.1

ADC of PMT 02

0 50 100 150 200 250 300 350 400 450 500 100 200 300 400 500 600 700 800 900 ADC of PMT 03^{adc03}_{Entries 54322}

Mean 202 RMS 123.4

ADC of PMT 03

0 50 100 150 200 250 300 350 400 450 500

200

400

600

800

1000

1200

ADC of PMT 04^{adc04}_{Entries 69071}

Mean 174 RMS 126.5

ADC of PMT 04

0 50 100 150 200 250 300 350 400 450 500

200

400

600

800

1000

1200

ADC of PMT 05^{adc05}_{Entries 63836}

Mean 172.4 RMS 117.2

ADC of PMT 05

0 50 100 150 200 250 300 350 400 450 500 100 200 300 400 500 600 700 ADC of PMT 06^{adc06}_{Entries 32722}

Mean 196.4 RMS 107.2

ADC of PMT 06

0 50 100 150 200 250 300 350 400 450 500 0 200 400 600 800 1000

1200

1400

1600

ADC of PMT 07^{adc07}_{Entries 58022}

Mean 137.4 RMS 114.4

ADC of PMT 07

0 50 100 150 200 250 300 350 400 450 500 0

200

400

600

800

1000

1200

ADC of PMT 08^{adc08}_{Entries 53112}

Mean 125.2 RMS 110.2

ADC of PMT 08

0 50 100 150 200 250 300 350 400 450 500 100 200 300 400 500 600 700 800 900 ADC of PMT 09^{adc09}_{Entries 12913}

Mean 186.3 RMS 120.9

ADC of PMT 09

0 50 100 150 200 250 300 350 400 450 500

200

400

600

800

1000

ADC of PMT 10^{adc10}_{Entries 50685}

Mean 158.7 RMS 127.1

ADC of PMT 10

0 50 100 150 200 250 300 350 400 450 500 0 200 400 600 800 1000

1200

1400

1600

ADC of PMT 11^{adc11}_{Entries 8127}

Mean 156.8 RMS 103.8

ADC of PMT 11

0 50 100 150 200 250 300 350 400 450 500 0

20

40

60

80

100

120 ADC of PMT 12^{adc12}_{Entries 14084}

Mean 226.3 RMS 82.3

ADC of PMT 12

0 50 100 150 200 250 300 350 400 450 500 0 50 100 150 200 250 300 350 400 450 ADC of PMT 13^{adc13}_{Entries 7710}

Mean 184.8 RMS 99.19

ADC of PMT 13

0 50 100 150 200 250 300 350 400 450 500 0 100 200 300 400 500 600 700 800 900 ADC of PMT 14^{adc14}_{Entries 13981}

Mean 216.5 RMS 109.7

ADC of PMT 14

0 50 100 150 200 250 300 350 400 450 500 0

100

200

300

400

500

600 ADC of PMT 15^{adc15}_{Entries 14211}

Mean 238.4 RMS 120.2

ADC of PMT 15

0 50 100 150 200 250 300 350 400 450 500 0

100

200

300

400

500 ADC of PMT 16^{adc16}_{Entries 11029}

Mean 206.3 RMS 101.3

ADC of PMT 16

0 50 100 150 200 250 300 350 400 450 500 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

ADC of PMT 17^{adc17}_{Entries 48748}

Mean 127.6 RMS 81.19

ADC of PMT 17

0 50 100 150 200 250 300 350 400 450 500 0 50 100 150 200 250 300 350 400 450 ADC of PMT 18^{adc18}_{Entries 6328}

Mean 190.3 RMS 104

ADC of PMT 18

0 50 100 150 200 250 300 350 400 450 500 0

100 200

300 400

500 600

ADC of PMT 19^{adc19}_{Entries 5170}

Mean 184.3 RMS 110.4

ADC of PMT 19

0 50 100 150 200 250 300 350 400 450 500 0

100

200

300

400

500 ADC of PMT 20^{adc20}_{Entries 2887}

Mean 174.1 RMS 105.8

ADC of PMT 20