-500-400 -300-200 -100 0 100 200 300 400 500 0 20 40 60 80 100 120 140 160 180 200 220 Corrected TDC of PMT 01^{tdc_c01}_{Entries 82625}

Mean 137.3 RMS 206.7

Corrected TDC of PMT 01

-500 -400-300 -200-100 0 100 200 300 400 500 0 50 100 150 200 250 300 Corrected TDC of PMT 02^{tdc_c02}_{Entries 97510}

Mean 132.2 RMS 204.8

Corrected TDC of PMT 02

-500-400 -300-200 -100 0 100 200 300 400 500 0 100 200 300 400 500 600 700 Corrected TDC of PMT 03^{tdc_c03}_{Entries 137667}

Mean 132.6 RMS 200.1

Corrected TDC of PMT 03

-500-400-300 -200-100 0 100 200 300 400 500 0

100 200 300

400 500

600 Corrected TDC of PMT 04^{tdc_c04}_{Entries 138519}

Mean 132.2 RMS 202.5

Corrected TDC of PMT 04

-500 -400-300 -200-100 0 100 200 300 400 500 0

100

200

300 400

500

Corrected TDC of PMT 05^{tdc_c05}_{Entries 113428}

Mean 131.8 RMS 199.7

Corrected TDC of PMT 05

-500-400 -300-200 -100 0 100 200 300 400 500 0 100 200 300 400

500 600 Corrected TDC of PMT 06 tdc_c06_{Entries 60374}

Mean 119.8 RMS 198

Corrected TDC of PMT 06

-500 -400-300 -200-100 0 100 200 300 400 500 0

100

200

300

400

500 Corrected TDC of PMT 07 tdc_c07_{Entries 116035}

Mean 132.9 RMS 203.4

Corrected TDC of PMT 07

-500-400 -300-200 -100 0 100 200 300 400 500 0 50 100 150 200 250 300

Corrected TDC of PMT 08 tdc_c08_{Entries 101791}

Mean 125.2 RMS 209.1

Corrected TDC of PMT 08

-500-400-300 -200-100 0 100 200 300 400 500 0 50 100 150 200 250 300 350 Corrected TDC of PMT 09 tdc_c09_{Entries 129547}

Mean 133 RMS 207.8

Corrected TDC of PMT 09

-500 -400-300 -200-100 0 100 200 300 400 500 0 20 40 60 80 100 120 140 160 180 Corrected TDC of PMT 10 tdc_c10_{Entries 103831}

Mean 132 RMS 210

Corrected TDC of PMT 10

-500-400 -300-200 -100 0 100 200 300 400 500 0 10 20 30 40 50 60 70 80 90

Corrected TDC of PMT 11^{tdc_c11}_{Entries 15781}

Mean 127 RMS 204.2

Corrected TDC of PMT 11

-500 -400-300 -200-100 0 100 200 300 400 500 0 10 20 30 40 50 60 70 Corrected TDC of PMT 12^{tdc_c12}_{Entries 3648}

Mean 90.33 RMS 189.3

Corrected TDC of PMT 12

-500-400 -300-200 -100 0 100 200 300 400 500 0 20 40 60 80 100 120 140 160 Corrected TDC of PMT 13^{tdc_c13}_{Entries 12222}

Mean 113 RMS 197.2

Corrected TDC of PMT 13

-500-400-300 -200-100 0 100 200 300 400 500 0 20 40 60 80 100 120 140 160 180 200 Corrected TDC of PMT 14^{tdc_c14}_{Entries 12857}

Mean 106.8 RMS 194.1

Corrected TDC of PMT 14

-500 -400-300 -200-100 0 100 200 300 400 500 0

50

100

150

200

250

Corrected TDC of PMT 15^{tdc_c15}_{Entries 18611}

Mean 112 RMS 194

Corrected TDC of PMT 15

-500-400 -300-200 -100 0 100 200 300 400 500 0 20 40 60 80 100 120 140 160 180 200 220 Corrected TDC of PMT 16^{tdc_c16}_{Entries 10190}

Mean 103.1 RMS 192.5

Corrected TDC of PMT 16

-500 -400-300 -200-100 0 100 200 300 400 500 0 100 200 300

400 500 600 Corrected TDC of PMT 17^{tdc_c17}_{Entries 71541}

Mean 123.5 RMS 200.4

Corrected TDC of PMT 17

-500-400 -300-200 -100 0 100 200 300 400 500 0 20 40 60 80 100 120 Corrected TDC of PMT 18^{tdc_c18}_{Entries 15213}

Mean 122.6 RMS 199.3

Corrected TDC of PMT 18

-500-400-300 -200-100 0 100 200 300 400 500 0

20

40

60

80

100 Corrected TDC of PMT 19^{tdc_c19}_{Entries 13934}

Mean 122.4 RMS 202.1

Corrected TDC of PMT 19

-500 -400-300 -200-100 0 100 200 300 400 500 0 10 20 30 40 50 60 70 Corrected TDC of PMT 20^{tdc_c20}_{Entries 12523}

Mean 123.2 RMS 207.8

Corrected TDC of PMT 20