Target y (m)

-0.2 -0.15 -0.1 -0.05 0 0.05 0.1 0.15 0.2 0

500

1000

1500

2000

2500

3000

3500

LHRS Target Y h3

Entries 378563

Mean -4.591e-05

RMS 0.03926

LHRS Target Y

Target Theta (rad)

-0.2 -0.15 -0.1 -0.05 0 0.05 0.1 0.15 0.2 0

500

1000

1500

2000

2500

3000

3500

4000

LHRS Target Theta h4

Entries 378563

Mean 0.001793

RMS 0.03703

LHRS Target Theta

Target Phi (rad)

-0.2 -0.15 -0.1 -0.05 0 0.05 0.1 0.15 0.2 0

1000

2000

3000

4000

5000

6000

7000

8000

9000

LHRS Target Phi h5

Entries 378563

Mean -0.001188

RMS 0.02324

LHRS Target Phi