PMT #

10 11 12 13 14 15 16 17 18 19

Rejection π

0

500

1000

1500

2000

2500

3000

Rejection Factors As a Function of PhotoElectron Cut π BB Cerenkov Large Angle

0 PE Cut 1 PE Cut 2 PE Cut 3 PE Cut