PhotoElectrons

-1 -0.5 0 0.5 1 1.5 2 2.5 3 3.5 4

Avg. Rejection π

0

200

400

600

800

1000

1200

Rejection Factors As a Function of PhotoElectron Cut π BB Cerenkov Average Large Angle