x 0 0.2 0.4 0.6 0.8 1 ξ

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 5.89 GeV Data 4.74 GeV Data = x ξ_2

= 1 GeV

2Q_2 = 2 GeV

2Q_2 = 4 GeV

2Q_2 = 10 GeV 2Q

Nachtmann Variable at E06-014 Kinematics