-0.2 -0.15 -0.1 -0.05 0 0.05 0.1 0.15 0.2 0

5

10

15

20

25

30 G12 G1C Pull distribution

/ ndf

2χ 46.34 / 30 Prob 0.02883 Constant 1.96±

14.56 Mean 0.002588 ± -0.004948 Sigma 0.00292 ± 0.02805