1.4-V/1.2-V Calibration Ratio

0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 0

20

40

60

80

100 Upstream_{Entries 768}

Mean 0.001648 ± 0.7784 RMS 0.001165 ± 0.04567 / ndf

2χ 41.42 / 30 Constant 4.0± 85 Mean 0.0013 ± 0.7782 Sigma 0.00099 ± 0.03412

Upstream

1.4-V/1.2-V Calibration Ratio

0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 0 10 20 30 40 50 60 Downstream

Entries 768 Mean 0.002029 ± 0.8173 RMS 0.001434 ± 0.05622 / ndf

2χ 9.035 / 14 Constant 3.3± 58.8 Mean 0.0036 ± 0.7932 Sigma 0.00256 ± 0.03833