-100 -50 0 50 100 150 -40

-30

-20

-10

0

-100 -50 0 50 100 150 -20

-15

-10

-5

0

5

-100 -50 0 50 100 150 -20

-15

-10

-5

0

-100 -50 0 50 100 150 -25

-20

-15

-10

-5

0

5

-100 -50 0 50 100 150 -25 -20 -15 -10 -5 0 5

-100 -50 0 50 100 150

-20

-15

-10

-5

0

5

-100 -50 0 50 100 150 -25 -20 -15 -10 -5 0 5

-100 -50 0 50 100 150 -20

-15

-10

-5

0

5

-100 -50 0 50 100 150 -60 -50 -40 -30 -20 -10 0 10

-100 -50 0 50 100 150

-20

-15

-10

-5

0

5

-100 -50 0 50 100 150 -20

-15

-10

-5

0

5

-100 -50 0 50 100 150 -25

-20

-15

-10

-5

0

5

-100 -50 0 50 100 150 -20

-15

-10

-5

0

5

-100 -50 0 50 100 150

-20

-15

-10

-5

0

-100 -50 0 50 100 150 -25

-20

-15

-10

-5

0

-100 -50 0 50 100 150 -25 -20 -15 -10 -5 0 5 164

-100 -50 0 50 100 150 -25 -20 -15 -10 -5 0 5

-100 -50 0 50 100 150

-120

-100 -80 -60 -40 -20 0

-100 -50 0 50 100 150

-20

-15

-10

-5

0

5

-100 -50 0 50 100 150 -35 -30 -25 -20 -15 -10 -5 0 5 174

-100 -50 0 50 100 150 -35 -30 -25 -20 -15 -10 -5 0 5 176

-100 -50 0 50 100 150

-20

-15

-10

-5

0

5 178

-100 -50 0 50 100 150 -30 -25 -20 -15 -10 -5 0 5 182

-100 -50 0 50 100 150 -25 -20

-15 -10 -5

0 5

-100 -50 0 50 100 150 -80 -70 -60 -50 -40 -30 -20 -10 0 10

-100 -50 0 50 100 150 -40

-30

-20

-10

0

-100 -50 0 50 100 150 -35 -30 -25 -20 -15 -10 -5 0 5

-100 -50 0 50 100 150 -25

-20

-15

-10

-5

0

-100 -50 0 50 100 150 -35 -30 -25 -20 -15 -10 -5 0 5

-100 -50 0 50 100 150 -25

-20

-15

-10 -5

0

5

-100 -50 0 50 100 150 -25 -20 -15 -10 -5 0 5 252

Trise(ns)

0 5 10 15 20 25 30 0

2

4

6

8

10 h1 h1 Entries 31 Mean 5.23 RMS 1.18 h1

Tfall(ns)

0 5 10 15 20 25 30 0

1

2

3

4

5 h2 h2 Entries 31 Mean 16.97 RMS 1.548 h2

Trise(ns)

0 5 10 15 20 25 30

Tfall(ns)

0

5

10

15

20

25

30 h3 h3 Entries 31 Mean x 5.23 Mean y 16.97 RMS x 1.18 RMS y 1.548 h3

Trise(ns)

0 5 10 15 20 25 30

Amplitude(mV)

0 20 40 60 80 100 120 140 160 180 200 h4 h4 Entries 31 Mean x 5.23 Mean y 29.86 RMS x 1.18 RMS y 19.83 h4